\begin{thebibliography}{1}\setlength{\itemsep}{-1ex}\small

\bibitem{Vlissides:94}
E.~Gamma, R.~Helm, R.~Johnson, and J.~Vlissides.
\newblock {\em {Design Patterns: Elements of Reusable Object-Oriented
  Software}}.
\newblock Addison-Wesley, Reading, MA, 1995.

\bibitem{Schmidt:02h}
A.~S. Gokhale, B.~Natarajan, J.~K. Cross, D.~C. Schmidt, C.~Andrews, S.~J.
  Fernandez, and C.~D. Gill.
\newblock {Towards Real-time Support in Fault-tolerant CORBA}.
\newblock In {\em Proceedings of the Workshop on Dependable Middleware-Based
  Systems}, Washington, DC, June 2002.

\bibitem{LSD:89}
J.~Lehoczky, L.~Sha, and Y.~Ding.
\newblock {The Rate Monotonic Scheduling Algorithm: Exact Characterization and
  Average Case Behavior}.
\newblock In {\em {Proceedings of the 10th IEEE Real-time Systems Symposium
  (RTSS~1989)}}, pages 166--171. IEEE Computer Society Press, 1989.

\bibitem{CorbaPI-Adopted:00}
{Object Management Group}.
\newblock {\em {Interceptors FTF Final Published Draft}}, {OMG Document
  ptc/00-04-05} edition, Apr. 2000.

\bibitem{CORBA:02c}
{Object Management Group}.
\newblock {\em {Real-time CORBA Specification}}, {1.1} edition, Aug. 2002.

\bibitem{FTCORBA_chap:04}
{Object Management Group}.
\newblock {\em {Fault Tolerant CORBA, Chapter 23, CORBA v3.0.3}}, {OMG Document
  formal/04-03-10} edition, Mar. 2004.

\bibitem{Schmidt:02g}
D.~C. Schmidt, B.~Natarajan, A.~Gokhale, N.~Wang, and C.~Gill.
\newblock {TAO: A Pattern-Oriented Object Request Broker for Distributed
  Real-time and Embedded Systems}.
\newblock {\em IEEE Distributed Systems Online}, 3(2), Feb. 2002.

\end{thebibliography}
